Turns the cache on if checked, off if unchecked.


Closes the QuickMon Cache monitor.


Resets cache contents and clears the cache measurement totals.


Selects which CD-ROM drive will display cache measurements.


If selected, your hard drive will be used for cache data storage.


If selected, your system RAM will be used for cache data storage.


Makes the new setting the active one.


Selects which hard drive will hold cache data.


Sets the cache size.  The colored area indicates the permitted range on your system.


If checked, saves video clips in the cache.